Pulseshape after averaging 500 events. Z=115 cm, 0 deg, PMT jitter = 140 ps

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

72 13 7 03 81 93 86 83 91 73 96 63 10 15 3 10 64 3 1 13 3 1 62 3 12 1 3 12 60 3 13 09 3 13 58 3 14 07 3 14 56 3 15 05 3 15 54 3 16 03 3 16 52 3 17 01 3

arrival time (ps)

# p h o to n s p er 1 0 p s b in