1.5

2.0

2.5

3.0

2 4 6 8

66 cm ϕ; all coils of copper

66 cm ϕ; alum. straight coils

48x66 cm; Al straight coils

48x66 cm; all coils of copper

Conductor Mass [metric tons]

P ow er @ 2 .1 & 3 .5 μ Ω -c m [ M W ]

2-T Solenoid: 15^o, 1.4-m Radius Bend