20

50

100

200

500

1 2 3 4 5 6 7 8 9 10

Peak ΔT [K]

"Flat" top [ms]

Temporal field homogeneity [%]

S e c ur ve la be ls fo r un its

20 T, 80 K System: 4 MW Outer Set Energizes Inner Set