-0.2

0

0.2

0.4

0.6

0.8

1.0

1.2

1.4

0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0

Total

Iron

Coil

Total Iron

Coil

Distance along axis [m]

F ie ld o n ax is [ T ]

Field of Iron Magnet for 1.25 T at Center of 2.5 m ϕ x 1.2 m Cylinder