ID

Task Name Duration Cost Start Finish 1 Targetry R&D 308 days $1,581,367 Mon 7/27/98 Wed 9/29/99 2 Liquid Metal/Beam 104 days $120,000 Tue 9/1/98 Fri 1/22/99 3

Containment Vessel 23 days $30,000 Tue 9/1/98 Thu 10/1/98 4

Instrumentaion 71 days $80,000 Fri 10/2/98 Fri 1/8/99 5

Test at AGS 10 days $10,000 Mon 1/11/99 Fri 1/22/99 6 Liquid Metal Jet I 84 days $80,000 Tue 9/1/98 Fri 12/25/98 7

Princeton Prototyping 44 days $50,000 Tue 9/1/98 Fri 10/30/98

Containment Vessel 30 days $20,000 Thu 11/12/98 Wed 12/23/98 13

Instrumentation 45 days $30,000 Thu 11/12/98 Wed 1/13/99 14

First test at AGS 5 days $10,000 Mon 2/1/99 Fri 2/5/99 15

AGS extraction upgrade 120 days $100,000 Thu 10/1/98 Wed 3/17/99

16 Test at AGS 10 days $10,000 Thu 3/18/99 Wed 3/31/99

17 20 T Pulsed Solenoid 260 days $565,000 Thu 10/1/98 Wed 9/29/99 18

Cryostat Design 60 days $30,000 Thu 10/1/98 Wed 12/23/98 22

Cryostat Fabricate 60 days $50,000 Thu 12/24/98 Wed 3/17/99 23

Move/Refurbish PS 40 days $30,000 Mon 10/19/98 Fri 12/11/98 24

Substation Attachment 40 days $50,000 Mon 12/28/98 Fri 2/19/99 25

Operation at 20T 0 days $0 Wed 9/29/99 Wed 9/29/99

29 RF Systems 305 days $616,367 Mon 7/27/98 Fri 9/24/99

30 LBL Transfer 59 days $45,000 Mon 10/5/98 Thu 12/24/98 31

Testing 40 days $35,000 Mon 10/5/98 Fri 11/27/98

32 Packing 14 days $5,000 Mon 11/30/98 Thu 12/17/98

33 Shipping 5 days $5,000 Fri 12/18/98 Thu 12/24/98

34 Low Level RF 113 days $30,000 Mon 11/9/98 Wed 4/14/99 35

Design 35 days $10,000 Mon 11/9/98 Fri 12/25/98

36 Purchase Components 48 days $15,000 Mon 12/28/98 Wed 3/3/99

37 Testing 30 days $5,000 Thu 3/4/99 Wed 4/14/99 38

Pulsing System 185 days $111,367 Mon 10/5/98 Fri 6/18/99