ID

Task Name Duration Cost Start Finish 42 Testing 60 days $38,872 Mon 3/29/99 Fri 6/18/99 43 RF Cavity 305 days $295,000 Mon 7/27/98 Fri 9/24/99 44

Design 90 days $25,000 Mon 7/27/98 Fri 11/27/98 45 Purchase/Fabricate 120 days $250,000 Mon 11/30/98 Fri 5/14/99 46 Assembly 20 days $5,000 Mon 5/17/99 Fri 6/11/99 47 Testing 60 days $15,000 Mon 7/5/99 Fri 9/24/99 48 Site Preparation 185 days $135,000 Mon 10/19/98 Fri 7/2/99 49

Power Service 70 days $20,000 Mon 1/4/99 Fri 4/9/99 50

Vacuum 120 days $50,000 Mon 1/4/99 Fri 6/18/99 51

DI Water 90 days $20,000 Mon 1/11/99 Fri 5/14/99

Coil Design 70 days $20,000 Mon 8/31/98 Fri 12/4/98 56

Coil Fabricate 120 days $30,000 Mon 12/7/98 Fri 5/21/99 57

Iron Design 90 days $20,000 Mon 10/26/98 Fri 2/26/99

58 Iron Fabricate 120 days $100,000 Mon 3/1/99 Fri 8/13/99 59

Support Design 80 days $20,000 Mon 11/9/98 Fri 2/26/99

60 Support Fabricate 120 days $50,000 Mon 3/1/99 Fri 8/13/99